2ß├╔≤░░╢≈b╝≈₧█1                    BBS Software (Door File) Type1                    ─────────────────────────────C  Select the number for the door information file your BBS creates:5  1) PCBOARD.SYS     PCBoard 14.0 through 14.5x ONLY!B  2) PCBOARD.SYS     Others using PCBOARD.SYS. Auntie (auntie.sys);  3) DOOR.SYS        Gap and other generic DOOR.SYS systems&  4) DOOR.SYS        Wildcat 3.x ONLY!C  5) DORINFO1.DEF    RBBS and software which writes color mode as 2A  6) DORINFO1.DEF    RA and software which writes color mode as 1  7) SFDOORS.DAT     Spitfire      5  Selection 2 allows entering an alternate file name.F  With the exception of #5 and #6, USBBSDOR only supports the original.  software's format for each information file.█,                         Name Of This System,                         ───────────────────F  The name entered here is displayed at USBBSDOR's termination in  theF  "Registered To:" message (registered copies only). The name used  inF  this parameter MUST be identical to the name used  when  ordering  a.  customized registration number for USBBSDOR.F  If  USBBSDOR is registered, the name entered here will also  be  the8  name used to personalize the off-line QSUSBBS utility.█3                   Idle Keyboard Time-Out (minutes)3                   ────────────────────────────────F  Enter the number of  minutes  before  a  keyboard  time-out  occurs.F  USBBSDOR cycles back to the BBS should this  happen.  USBBSDOR  willF  beep at the caller once every fifteen seconds during the last minuteF  of the keyboard time-out  period before returning the  caller to theF  BBS.  It is then up to the BBS software to log the caller off of the7  system if there is no further activity by the caller.█/                    Disable CTS Signal Checking/                    ───────────────────────────F  Always  answer No to this question unless you know for a  fact  thatF  disabling  (answering  Yes) is best for your system.  NEVER  disable8  (answer Yes) CTS when using a high speed or MNP modem.█1                  Location of Current USBBSxx.LST1                  ───────────────────────────────F  Enter  the  location  where  you  will  be  keeping  the   EXTRACTEDF  USBBSxx.LST each month  (xx = version).  NEVER place a file name  inF  this parameter.  USBBSDOR will look for the  newest  USBBSxx.LST  inF  this location each time it runs. USBBSDOR uses actual DOS file dates*  when determining the newest USBBSxx.LST.F  This is also the location USBBSDOR will automatically extract a  newF  list  to (if your copy of USBBSDOR is registered)  if a new list  isF  detected in a new USBBSxx.ZIP file. Refer to the USBBSDOR manual for8  additional details regarding new list auto-extraction.█.                     Disable (D)ownload Option.                     ─────────────────────────F  USBBSDOR provides the caller a simple facility for  downloading  theF  the current USBBSxx.ZIP.  When (D) is selected, USBBSDOR will chooseF  the current USBBSxx.ZIP file and display its size and download  timeF  to the caller.  The caller then chooses a transfer protocol and  the  transfer will begin.F  If  the QSUSBBS off-line utility has been added as a  download,  theD  caller will be offered a choice between the USBBS list or QSUSBBS.F  If the caller has insufficient time remaining to transfer the  file,#  the download will not be allowed.F  If  you do NOT wish your callers to be able to download  inside  the*  door, answer Yes to disable downloading.█0                     Security Needed to Download0                     ───────────────────────────F  Enter  the security level required for downloading  USBBSxx.ZIP  and  QSUSBBS.ZIP (if installed).F  Some  Sysops may want to allow new or non-subscribing callers accessF  to the list, but not want them to be able to use USBBSDOR's download<  feature. This parameter facilitates this Sysop preference.F  USBBSDOR uses the caller's security level as it is provided  in  the'  BBS software's door information file.█1                   Location of Newest USBBSxx.ZIP1                   ──────────────────────────────F  If  you allow downloading, this parameter works in the same  fashionF  as "Location of current USBBSxx.LST". Simply enter a location  whereF  the newest USBBSxx.ZIP (xx = version) will be located. USBBSDOR willF  will  look  for the newest USBBSxx.ZIP in this  location  whenever a  caller requests a download.
          F  If you wish to allow the caller to download QSUSBBS.ZIP in USBBSDOR,9  the location entered here is also used for QSUSBBS.ZIP.F  Even  if downloading is not desired, this parameter is also used  ifF  USBBSDOR  is registered and you wish it to automatically detect  andF  extract a new USBBS list to its appropriate location.  Refer to  the=  USBBSDOR manual for a detailed explanation of this feature.█/                    Disable "searching" message/                    ───────────────────────────F  When performing certain search functions on the USBBS list, USBBSDORF  will  display a "searching..." message between  "finds".  On  fasterF  systems, these "searching.." messages come and go so fast that  theyF  appear to be little glitches on the screen. After you have installedF  USBBSDOR,  select CA as a state to search then observe between  areaF  codes  as listings are displayed.  Usually, only  nodes  running  onF  8088s,  slow drives, or in extremely heavy network traffic will need  this option enabled.█0                    Line Separating Each Listing0                    ────────────────────────────F  You  may specify between four character types to use for  separating;  each listing as it is displayed, or no separation at all.1  Valid answers are 0, 1, 2, or 3 as shown below:D  Type 0:  NONE.  Each listing will be displayed with no separation.:  Type 1:  ASCII  45 characters  (-----------------------):  Type 2:  ASCII 196 characters  (───────────────────────):  Type 3:  ASCII 205 characters  (═══════════════════════)C  Separator type #2 is highly recommended for easiest list viewing.█5                     Set Non-Standard COM Information5                     ────────────────────────────────F  If COM ports other than 1 or 2 are used, the base address and IRQ of)  each non-standard port must be defined.F  Answering Y to this parameter moves the cursor to the IRQ  selection9  window where you may enter the appropriate information.A  Enter the base address in HEX for the appropriate ports in use.8  Enter the IRQ (1-15) for the appropriate ports in use.F  Allowing multiple ports to be defined in a single USBBSDOR.CNF  fileF  facilitates the need for only one configuration file for all  nodes.F  When a COM port other than 1 or 2 is detected in the BBS door infor-A  mation file, the appropriate information is used for that port.B  Base address and IRQ settings for COM 1 and 2 cannot be changed.█5                     (F)ast-search Area Code or State5                     ────────────────────────────────F  The Sysop may configure the  (F)ast-search  command  to  immediatelyF  display an Area code or State without any additional prompting  fromF  the caller. Simply enter a three digit area code, or two digit state*  code (Sysop's choice) at this parameter.   F  Tip: If there are numerous listings in your area code,  you may wishF  to enter just your area code. If you are in an area code where thereF  are a limited number of listings in the USBBS list, you may wish  to  enter the state code.E  To disable the (F)ast-search option, simply leave this field blank.█0                    USBBSDOR Registration Number0                    ────────────────────────────F  USBBSDOR  is fully functional in unregistered copies except for  theF  "automatic new list extraction" feature.  Registration enables  thisF  feature  and  replaces the "Unregistered Copy"  message  at  program5  termination with the name of the registered system.F  Registration  also will allow you to personalize a copy  of  QSUSBBSF  with your BBS name and phone number (see the enclosed  documentation  for additional information).F  You may receive a customized registration number INSTANTLY! Refer to-  the file ORDER.FRM located in USBDOR50.ZIP.█